en-us	Clear all

en-us	Undo

en-us	Reset to default

en-us	before

en-us	later

en-us	Cancel

en-us	Use

en-us	Custom Range

en-us	Today

en-us	Confirmation

en-us	Yes

en-us	No

en-us	copy snippet to clipboard

en-us	Code snippet copied to clipboard

en-us	Dark theme

en-us	(optional)

en-us	of

en-us	Pages -

en-us	Previous Page

en-us	Next Page

en-us	Page

en-us	Search

en-us	Remove all

en-us	Remove

en-us	Select all items on this page

en-us	Select all items on all pages

en-us	Unselect all items

en-us	Unselect all items on this page

en-us	Cancel

en-us	Quick picks

en-us	Last hour

en-us	Last 12 hours

en-us	Last 24 hours

en-us	Last 5 days

en-us	Last 7 days

en-us	Last 30 days

en-us	Start

en-us	End

en-us	No actions available for this selection

en-us	No actions available

en-us	Commands

en-us	More

en-us	of selected

en-us	All selected

en-us	more steps are available

en-us	Optional

en-us	Next

en-us	Back

en-us	This is a non-interactive widget preview

en-us	Remove

en-us	Display Transforms

en-us	None

en-us	Change Point

en-us	Difference

en-us	Floating Average

en-us	Linear

en-us	Normalize

en-us	Percentile Standardized

en-us	Smoothing

en-us	Smoothing Standardized

en-us	Standardize

en-us	Inspect selection in the data explorer

en-us	Zoom In

en-us	Zoom Out

en-us	Clear selection

en-us	Edit widget

en-us	Reload data

en-us	Remove widget

en-us	Remove Widget

en-us	Explore this data

en-us	Metrics

en-us	This field is required

en-us	Unknown icon

en-us	This is a preview of your widget

en-us	As you make configuration changes, this area will update to match. To get started, select a widget type on the configuration panel.

en-us	Creating Widget

en-us	Create Widget

en-us	Customize

en-us	Save Changes

en-us	Editing

en-us	Select Item

en-us	Add new rule

en-us	Default color

en-us	No color rules

en-us	color rules

en-us	Select data source

en-us	Select Data Source

en-us	Data Sources

en-us	Select a data source

en-us	Something went wrong with the data source:

en-us	Data source needs to be configured

en-us	Embedded Content

en-us	What do you want to show in the widget?

en-us	Show the contents of a specific URL

en-us	Show the exact HTML I supply below

en-us	Description

en-us	Label

en-us	Set label

en-us	Background Color

en-us	Units

en-us	no label

en-us	Default Color

en-us	a whole number

en-us	a number

en-us	Must be equal to

en-us	Must be between and

en-us	Must be not larger than

en-us	Must be not smaller than

en-us	Must be

en-us	hours

en-us	minutes

en-us	seconds

en-us	h

en-us	min

en-us	sec

en-us	Refresh

en-us	Refresh widget periodically

en-us	By default, the widget will refresh every .

en-us	Custom refresh rate

en-us	Enabled

en-us	Use default value

en-us	Disabled

en-us	Min Value

en-us	Max Value

en-us	Use Float Label

en-us	Float Label

en-us	Set float label

en-us	Set description

en-us	Description cannot be longer than characters.

en-us	How do you want to set warning/critical thresholds?

en-us	Warning value

en-us	Never show the warning state

en-us	This field is required

en-us	Warning threshold should be greater than critical threshold

en-us	Warning threshold should be lower than critical threshold

en-us	Critical value

en-us	Set critical value

en-us	Critical threshold should be greater than warning threshold

en-us	Critical threshold should be lower than warning threshold

en-us	Warning and critical when below threshold values

en-us	Never show critical or warning states for this KPI

en-us	Set custom thresholds for this widget

en-us	Custom thresholds

en-us	No thresholds

en-us	Starting timespan

en-us	Starting Timespan

en-us	This field is required

en-us	Chart legend

en-us	Select Legend Orientation

en-us	Chart y-axis label

en-us	Set chart y-axis label

en-us	Chart type

en-us	Line

en-us	Stacked area

en-us	Stacked % area

en-us	Bar

en-us	Status

en-us	No timespan

en-us	No legend

en-us	No y-axis label

en-us	Widget title

en-us	Set widget title

en-us	Widget subtitle

en-us	Do not show a subtitle

en-us	Widget link URL

en-us	Do not link to another page

en-us	Widget description

en-us	This won't be shown on the widget, but can be helpful for other users who want to re-use this widget on their own dashboards

en-us	No description

en-us	Hide widget header

en-us	Collapsible

en-us	No title

en-us	no subtitle

en-us	Entity formatting

en-us	Icon

en-us	Status

en-us	Details URL

en-us	Label URL

en-us	Then

en-us	Group by

en-us	Add another level

en-us	No groups

en-us	At least one value must be added.

en-us	Add new value

en-us	Default Metric

en-us	Select Value

en-us	Chart Series Data Field

en-us	Chart Type

en-us	Select chart type

en-us	Legend

en-us	Legend format

en-us	Content format

en-us	Donut

en-us	Pie

en-us	Vertical Bar

en-us	Horizontal Bar

en-us	Raw

en-us	Donut Content Configuration

en-us	Aggregate

en-us	Select Format

en-us	Format

en-us	Show this column

en-us	Column width (px)

en-us	Auto width

en-us	Minimum width of the column is 62px

en-us	All columns cannot have fixed width.

en-us	At least one column must be added.

en-us	Add new column

en-us	Reset columns

en-us	Column

en-us	Are you sure?

en-us	Resetting the columns will revert them to their default configurations. Do you wish to proceed?

en-us	Reset Columns

en-us	All columns can not have fixed width.

en-us	Label

en-us	URL

en-us	Open in the same window

en-us	Value

en-us	Column

en-us	At least one column must be added.

en-us	Add new column

en-us	Reset columns

en-us	Sort by

en-us	Select column

en-us	Descending

en-us	No columns are sortable.

en-us	No sorting

en-us	Descending

en-us	Ascending

en-us	Scroll Type

en-us	Select scroll type

en-us	Page size options set

en-us	Select size options

en-us	Item Types

en-us	Page size set is required

en-us	Default page size

en-us	Select page size

en-us	Page size is required

en-us	Virtual scroll

en-us	Paginator

en-us	Default scroll

en-us	Scroll Type:

en-us	Unknown

en-us	At least one series must be added.

en-us	Add new series

en-us	Series data

en-us	Cancel

en-us	Back

en-us	Value

en-us	Blue

en-us	Blue Light

en-us	Blue Dark

en-us	Pink

en-us	Pink Light

en-us	Pink Dark

en-us	Sea Green

en-us	Sea Green Light

en-us	Sea Green Dark

en-us	Violet

en-us	Violet Light

en-us	Violet Dark

en-us	Lime Green

en-us	Lime Green Light

en-us	Lime Green Dark

en-us	Orange

en-us	Orange Light

en-us	Orange Dark

en-us	Ultramarine

en-us	Ultramarine Light

en-us	Ultramarine Dark

en-us	Bordeaux

en-us	Bordeaux Light

en-us	Bordeaux Dark

en-us	Ochroid

en-us	Ochroid Light

en-us	Ochroid Dark

en-us	Anthracite

en-us	Anthracite Light

en-us	Anthracite Dark

en-us	Down

en-us	Down Light

en-us	Critical

en-us	Critical Light

en-us	Warning

en-us	Warning Light

en-us	Unknown Light

en-us	Ok

en-us	Ok Light

en-us	Info

en-us	Info Light

en-us	Not Applicable

en-us	Whoops, something went wrong

en-us	There was an unexpected error.

en-us	403 - Forbidden

en-us	The requested action was forbidden.

en-us	404 - Not Found

en-us	The requested resource could not be found.

en-us	Presentation

en-us	Data and calculations

en-us	Empty Custom Widget

en-us	Custom Widget Configuration

en-us	Empty Embedded Content Widget

en-us	Raw Formatter

en-us	Si Units Formatter

en-us	Icon

en-us	Empty KPI Widget

en-us	New Widget

en-us	Right

en-us	Bottom

en-us	Status With Icon

en-us	Link

en-us	Percentage Formatter

en-us	Sum

en-us	Percentage

en-us	Data and Calculations

en-us	Empty Proportional Widget

en-us	Empty Risk Score Widget

en-us	No Formatter

en-us	Empty Table Widget

en-us	Empty Timeseries Widget