---
id: 394
email: solawi@falkenhof-strothe.de
encrypted_password: "$2a$10$K0ACgLH68w6ETbjuyyoAgeLfUND4F5PfC.nntV62hTjpLr66gg/Lu"
reset_password_token: 
reset_password_sent_at: 
remember_created_at: 
sign_in_count: 0
current_sign_in_at: 
last_sign_in_at: 
current_sign_in_ip: 
last_sign_in_ip: 
created_at: 2017-02-24 17:36:14.733677000 Z
updated_at: 2017-02-25 14:24:21.469482370 Z
name: Jens Weidemann
confirmation_token: zC-uzxxuPDjFQYyPgbJq
confirmed_at: 2017-02-25 14:24:21.443016359 Z
confirmation_sent_at: 2017-02-24 17:36:14.735432000 Z
unconfirmed_email: 
phone: 056319878881
