---
email: csa@hofpente.de
encrypted_password: "$2a$10$mLk4gSx8AcRsc6ZWIJLOI.9EIx0PP.eMEoQy.UUKIAeK.BOv9PVkO"
reset_password_token: 
reset_password_sent_at: 
remember_created_at: 
sign_in_count: 0
current_sign_in_at: 
last_sign_in_at: 
current_sign_in_ip: 
last_sign_in_ip: 
created_at: 2014-06-02 15:39:15.000000000 Z
updated_at: 2014-06-02 15:39:15.000000000 Z
name: CSA Hof Pente
authentication_token: 
confirmation_token: ECo64NoWtEUWq4w7GGLB
confirmed_at: 
confirmation_sent_at: 2014-06-02 15:39:15.000000000 Z
unconfirmed_email: 
phone: 
id: 76
