---
id: 337
email: hmassmann@osnanet.de
encrypted_password: "$2a$10$fGMuxX076yN.LuuiaIH24unf8.CUwaD12SDylS.AKGvFjpaxFqF/a"
reset_password_token: 
reset_password_sent_at: 
remember_created_at: 
sign_in_count: 0
current_sign_in_at: 
last_sign_in_at: 
current_sign_in_ip: 
last_sign_in_ip: 
created_at: 2016-07-05 20:09:53.930780000 Z
updated_at: 2016-07-05 20:09:53.930780000 Z
name: Hermann Maßmann
confirmation_token: RCsuxsNX_qRyoxkJUJK4
confirmed_at: 
confirmation_sent_at: 2016-07-05 20:09:54.836413000 Z
unconfirmed_email: 
phone: 
