---
email: mwellne@gwdg.de
encrypted_password: "$2a$10$MdFwlCCM4Yx0llxDQBGtLeYKdFnrwEnQg2WyvDdLFCjTHaz11fWJW"
reset_password_token: 
reset_password_sent_at: 
remember_created_at: 
sign_in_count: 0
current_sign_in_at: 
last_sign_in_at: 
current_sign_in_ip: 
last_sign_in_ip: 
created_at: 2015-04-22 13:45:32.000000000 Z
updated_at: 2015-04-22 13:45:32.000000000 Z
name: Marie Wellner
authentication_token: 
confirmation_token: 6EWYgA5cNdqtC1RMxPeS
confirmed_at: 
confirmation_sent_at: 2015-04-22 13:45:32.000000000 Z
unconfirmed_email: 
phone: 
id: 204
