---
email: post@hofgemeinschaft-oldendorf.de
encrypted_password: "$2a$10$MXicnhnPXu9XQvwBVF31yeaahO/NctiMhrb9XnZCoNUB0HHRrwxx."
reset_password_token: 
reset_password_sent_at: 
remember_created_at: 
sign_in_count: 0
current_sign_in_at: 
last_sign_in_at: 
current_sign_in_ip: 
last_sign_in_ip: 
created_at: 2014-04-14 06:45:16.000000000 Z
updated_at: 2014-04-14 06:45:16.000000000 Z
name: Hofgemeinschaft Oldendorf
authentication_token: 
confirmation_token: md4gx5QLjsqi7dxWGbBE
confirmed_at: 
confirmation_sent_at: 2014-04-14 06:45:16.000000000 Z
unconfirmed_email: 
phone: 
id: 35
