---
email: info@hof-hollergraben.de
encrypted_password: "$2a$10$RbvbFt1FiL6EU77oQStpL.9uPqRnFpEs41sAp7vWmW3yPUPwRXaei"
reset_password_token: 
reset_password_sent_at: 
remember_created_at: 
sign_in_count: 0
current_sign_in_at: 
last_sign_in_at: 
current_sign_in_ip: 
last_sign_in_ip: 
created_at: 2014-05-12 09:14:49.000000000 Z
updated_at: 2014-05-12 09:15:44.373119251 Z
name: Klaus Strüber
authentication_token: 
confirmation_token: 
confirmed_at: 2014-05-12 09:15:44.323964945 Z
confirmation_sent_at: 2014-05-12 09:14:49.000000000 Z
unconfirmed_email: 
phone: 
id: 47
