---
email: admin@teikei.com
encrypted_password: $2a$10$GaP1WE5J1lImERutWMO1Zu8E3pu2sPnKU..d5FOwxKEB1JN6eTHje
reset_password_token: 
reset_password_sent_at: 
remember_created_at: 
sign_in_count: 0
current_sign_in_at: 
last_sign_in_at: 
current_sign_in_ip: 
last_sign_in_ip: 
created_at: 2013-10-29 12:43:13.000000000 Z
updated_at: 2013-10-29 12:43:13.000000000 Z
name: Default Superadmin
authentication_token: 
confirmation_token: 
confirmed_at: 2013-10-29 12:43:13.000000000 Z
confirmation_sent_at: 
unconfirmed_email: 
id: 2
