---
id: 265
email: mail@lindenhof-gelsenkirchen.de
encrypted_password: "$2a$10$DuFslKhypXRPsWRDqwvbfu9TQqaVLGzfg1S26Q8M3T3C0to2DpII."
reset_password_token: 
reset_password_sent_at: 
remember_created_at: 
sign_in_count: 0
current_sign_in_at: 
last_sign_in_at: 
current_sign_in_ip: 
last_sign_in_ip: 
created_at: 2015-11-01 20:25:47.000000000 Z
updated_at: 2015-11-01 20:25:47.000000000 Z
name: Schulze Schleithoff
confirmation_token: d5ada47bfe58bd47495381f3278d43d61e56bf72d759c8dd1b7ac269656da45a
confirmed_at: 
confirmation_sent_at: 2015-11-01 20:25:48.000000000 Z
unconfirmed_email: 
phone: 0175-2027135
