"synopLand" = { unexpandedDescriptors = 307080; }
"synopLandFromCoastalAndIslandStations" = { unexpandedDescriptors = 307079; }
"synopMobil" = { unexpandedDescriptors = 307090; }
"surfaceObservationOneHour" = { unexpandedDescriptors = 307091; }
"synopOneHour" = { unexpandedDescriptors = 307096; }
"snow" = { unexpandedDescriptors = 307101; }
"pilotPressureCoordinate" = { unexpandedDescriptors = 309050; }
"pilotHeightCoordinate" = { unexpandedDescriptors = 309051; }
"temp" = { unexpandedDescriptors = 309052; }
"tempDrop" = { unexpandedDescriptors = 309053; }
"climat" = { unexpandedDescriptors = 307073; }
"mooredBuoys" = { unexpandedDescriptors = 315008; }
"driftingBuoys" = { unexpandedDescriptors = 315009; }
"subSurfaceProfilingFloats" = { unexpandedDescriptors = 315003; }
"XbtTemperatureProfile" = { unexpandedDescriptors = 315004; }
"Trackob" = { unexpandedDescriptors = 308010; }
"AtovsHirs" = { unexpandedDescriptors = 310008 ; }
"AtovsAmsuA" = { unexpandedDescriptors = 310009 ; }
"AtovsAmsuB" = { unexpandedDescriptors = 310010 ; }
"AtovsAmsuB" = { unexpandedDescriptors = 310010 ; }
"AtovsFieldOfView" = { unexpandedDescriptors = 310011 ; }
"AtovsChannel" = { unexpandedDescriptors = 310012 ; }
"AtovsChannel" = { unexpandedDescriptors = 310012 ; }
"Avhrr" = { unexpandedDescriptors = 310013 ; }
"MeteosatRadiance" = { unexpandedDescriptors = 310015 ; }
"MsgRadiance" = { unexpandedDescriptors = 310016 ; }
"SsmisTemperature" = { unexpandedDescriptors = 310025 ; }
"SatelliteRadioOccultation" = { unexpandedDescriptors = 310026 ; }
"MipasOrGomos" = { unexpandedDescriptors = 310030 ; }
"Cris" = { unexpandedDescriptors = 310060 ; }
"Atms" = { unexpandedDescriptors = 310061 ; }
"Viirs" = { unexpandedDescriptors = 310062 ; }
"seaSurfaceTemperature" = { unexpandedDescriptors = 310063 ; }
"aerosolOpticalThickness" = { unexpandedDescriptors = 310064 ; }
"OmpsNadirProfile" = { unexpandedDescriptors = 310065 ; }
"OmpsTotalColumn" = { unexpandedDescriptors = 310066 ; }
"OmpsTotalColumn" = { unexpandedDescriptors = 310065 ; }
"amdar" = { unexpandedDescriptors = 311005 ; }
"WigosAmdar" = { unexpandedDescriptors = 311010 ; }
"aircraftReport" = { unexpandedDescriptors = 311001 ; }
"aircraftAscentDescentProfile" = { unexpandedDescriptors = 311008 ; }
"aircraftAscentDescentProfile" = { unexpandedDescriptors = 311009 ; }
"aircraftReportWithSecondsAndPressure" = { unexpandedDescriptors = [301051, 4006,7002, 10004,12001, 11001, 11002, 11031, 11032, 11033, 20041] ; }
"Iagos" = { unexpandedDescriptors = 311011 ; }
"Hirs" = { unexpandedDescriptors = 312014 ; }
"microwaveSoundingUnit" = { unexpandedDescriptors = 312016 ; }
"stratosphericSoundingUnit" = { unexpandedDescriptors = 312018 ; }
"waveScatterometer" = { unexpandedDescriptors = 312020 ; }
"windScatterometer" = { unexpandedDescriptors = 312021 ; }
"radarAltimeter" = { unexpandedDescriptors = 312022 ; }
"waveScatterometerEnhanced" = { unexpandedDescriptors = 312024 ; }
"Quickscat" = { unexpandedDescriptors = 312026 ; }
"SeawindsQuickscat" = { unexpandedDescriptors = 312028 ; }
"AatsrSeaSurfaceTemperature" = { unexpandedDescriptors = 312045 ; }
"Meris" = { unexpandedDescriptors = 312050 ; }
"oceanCrossSpectraWvs" = { unexpandedDescriptors = 312051 ; }
"radarAltimeter2" = { unexpandedDescriptors = 312052 ; }
"oceanWaveSpectra" = { unexpandedDescriptors = 312053 ; }
"AscatL1b" = { unexpandedDescriptors = 312058 ; }
"AscatL1bL2" = { unexpandedDescriptors = 312061 ; }
"Smos" = { unexpandedDescriptors = 312070 ; }
"Siral" = { unexpandedDescriptors = 312071 ; }
"IasiL1c" = { unexpandedDescriptors = 340007 ; }
"SaralAltika" = { unexpandedDescriptors = 340011 ; }


