# Concept stepType for ECMWF
# set uses the FIRST one
# get returns the LAST match

"instant" = {timeRangeIndicator=0;}
"instant" = {timeRangeIndicator=10;}
"instant" = {timeRangeIndicator=1;}
"instant" = {timeRangeIndicator=14;} # Fields from DWD in MARS

"avg"     = {timeRangeIndicator=3;}

"avgd"    = {timeRangeIndicator=113;}
"avgfc"   = {timeRangeIndicator=113;}

"accum"   = {timeRangeIndicator=4;}
"accum"   = {timeRangeIndicator=2;}

# Since grib1 has not min/max, we had to use our own convention
# therefore we set the centre to ECMWF (98)
"min"     = {timeRangeIndicator=2;centre=98;}
"min"     = {timeRangeIndicator=119;}
"max"     = {timeRangeIndicator=2;centre=98;}
"max"     = {timeRangeIndicator=118;}

"diff"    = {timeRangeIndicator=5;}
"rms"     = {timeRangeIndicator=120;}
"sd"      = {timeRangeIndicator=121;}
"cov"     = {timeRangeIndicator=122;}
"avgua"   = {timeRangeIndicator=123;}
"avgia"   = {timeRangeIndicator=124;}

"avgas"   = {timeRangeIndicator=128;}
"avgad"   = {timeRangeIndicator=130;}
"avgid"   = {timeRangeIndicator=133;}
