#Reserved
'Reserved' = {
          table2Version = 1 ;
          indicatorOfParameter = 0 ;
          }
#Pressure
'Pa' = {
          table2Version = 1 ;
          indicatorOfParameter = 1 ;
          }
#Mean sea level pressure
'Pa' = {
          table2Version = 1 ;
          indicatorOfParameter = 2 ;
          }
#Pressure tendency
'Pa s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 3 ;
          }
#Potential vorticity
'K m**2 kg**-1 s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 4 ;
          }
#ICAO Standard Atmosphere reference height
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 5 ;
          }
#Geopotential
'm**2 s**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 6 ;
          }
#Geopotential height
'gpm' = {
          table2Version = 1 ;
          indicatorOfParameter = 7 ;
          }
#Geometrical height
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 8 ;
          }
#Standard deviation of height
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 9 ;
          }
#Total column ozone
'Dobson' = {
          table2Version = 1 ;
          indicatorOfParameter = 10 ;
          }
#Temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 11 ;
          }
#Virtual potential temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 12 ;
          }
#Potential temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 13 ;
          }
#Pseudo-adiabatic potential temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 14 ;
          }
#Maximum temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 15 ;
          }
#Minimum temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 16 ;
          }
#Dew point temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 17 ;
          }
#Dew point depression (or deficit)
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 18 ;
          }
#Lapse rate
'K m**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 19 ;
          }
#Visibility
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 20 ;
          }
#Radar spectra (1)
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 21 ;
          }
#Radar spectra (2)
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 22 ;
          }
#Radar spectra (3)
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 23 ;
          }
#Parcel lifted index (to 500 hPa)
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 24 ;
          }
#Temperature anomaly
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 25 ;
          }
#Pressure anomaly
'Pa' = {
          table2Version = 1 ;
          indicatorOfParameter = 26 ;
          }
#Geopotential height anomaly
'gpm' = {
          table2Version = 1 ;
          indicatorOfParameter = 27 ;
          }
#Wave spectra (1)
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 28 ;
          }
#Wave spectra (2)
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 29 ;
          }
#Wave spectra (3)
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 30 ;
          }
#Wind direction
'Degree true' = {
          table2Version = 1 ;
          indicatorOfParameter = 31 ;
          }
#Wind speed
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 32 ;
          }
#u-component of wind
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 33 ;
          }
#v-component of wind
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 34 ;
          }
#Stream function
'm2 s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 35 ;
          }
#Velocity potential
'm2 s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 36 ;
          }
#Montgomery stream function
'm**2 s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 37 ;
          }
#Sigma coordinate vertical velocity
's**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 38 ;
          }
#Pressure Vertical velocity
'Pa s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 39 ;
          }
#Vertical velocity
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 40 ;
          }
#Absolute vorticity
's**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 41 ;
          }
#Absolute divergence
's**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 42 ;
          }
#Relative vorticity
's**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 43 ;
          }
#Relative divergence
's**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 44 ;
          }
#Vertical u-component shear
's**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 45 ;
          }
#Vertical v-component shear
's**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 46 ;
          }
#Direction of current
'Degree true' = {
          table2Version = 1 ;
          indicatorOfParameter = 47 ;
          }
#Speed of current
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 48 ;
          }
#U-component of current
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 49 ;
          }
#V-component of current
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 50 ;
          }
#Specific humidity
'kg kg**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 51 ;
          }
#Relative humidity
'%' = {
          table2Version = 1 ;
          indicatorOfParameter = 52 ;
          }
#Humidity mixing ratio
'kg kg**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 53 ;
          }
#Precipitable water
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 54 ;
          }
#Vapour pressure
'Pa' = {
          table2Version = 1 ;
          indicatorOfParameter = 55 ;
          }
#Saturation deficit
'Pa' = {
          table2Version = 1 ;
          indicatorOfParameter = 56 ;
          }
#Evaporation
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 57 ;
          }
#Cloud ice
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 58 ;
          }
#Precipitation rate
'kg m**-2 s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 59 ;
          }
#Thunderstorm probability
'%' = {
          table2Version = 1 ;
          indicatorOfParameter = 60 ;
          }
#Total precipitation
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 61 ;
          }
#Large scale precipitation
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 62 ;
          }
#Convective precipitation (water)
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 63 ;
          }
#Snow fall rate water equivalent
'kg m**-2 s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 64 ;
          }
#Water equivalent of accumulated snow depth
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 65 ;
          }
#Snow depth
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 66 ;
          }
#Mixed layer depth
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 67 ;
          }
#Transient thermocline depth
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 68 ;
          }
#Main thermocline depth
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 69 ;
          }
#Main thermocline anomaly
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 70 ;
          }
#Total cloud cover
'(0 - 1)' = {
          table2Version = 1 ;
          indicatorOfParameter = 71 ;
          }
#Convective cloud cover
'(0 - 1)' = {
          table2Version = 1 ;
          indicatorOfParameter = 72 ;
          }
#Low cloud cover
'(0 - 1)' = {
          table2Version = 1 ;
          indicatorOfParameter = 73 ;
          }
#Medium cloud cover
'(0 - 1)' = {
          table2Version = 1 ;
          indicatorOfParameter = 74 ;
          }
#High cloud cover
'(0 - 1)' = {
          table2Version = 1 ;
          indicatorOfParameter = 75 ;
          }
#Cloud water
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 76 ;
          }
#Best lifted index (to 500 hPa)
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 77 ;
          }
#Convective snowfall
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 78 ;
          }
#Large scale snowfall
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 79 ;
          }
#Water temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 80 ;
          }
#Land cover (1=land, 0=sea)
'(0 - 1)' = {
          table2Version = 1 ;
          indicatorOfParameter = 81 ;
          }
#Deviation of sea-level from mean
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 82 ;
          }
#Surface roughness
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 83 ;
          }
#Albedo
'%' = {
          table2Version = 1 ;
          indicatorOfParameter = 84 ;
          }
#Soil temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 85 ;
          }
#Soil moisture content
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 86 ;
          }
#Vegetation
'%' = {
          table2Version = 1 ;
          indicatorOfParameter = 87 ;
          }
#Salinity
'kg kg**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 88 ;
          }
#Density
'kg m**-3' = {
          table2Version = 1 ;
          indicatorOfParameter = 89 ;
          }
#Water run-off
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 90 ;
          }
#Ice cover (1=land, 0=sea)
'(0 - 1)' = {
          table2Version = 1 ;
          indicatorOfParameter = 91 ;
          }
#Ice thickness
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 92 ;
          }
#Direction of ice drift
'Degree true' = {
          table2Version = 1 ;
          indicatorOfParameter = 93 ;
          }
#Speed of ice drift
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 94 ;
          }
#U-component of ice drift
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 95 ;
          }
#V-component of ice drift
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 96 ;
          }
#Ice growth rate
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 97 ;
          }
#Ice divergence
's**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 98 ;
          }
#Snow melt
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 99 ;
          }
#Signific.height,combined wind waves+swell
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 100 ;
          }
#Mean Direction of wind waves
'Degree true' = {
          table2Version = 1 ;
          indicatorOfParameter = 101 ;
          }
#Significant height of wind waves
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 102 ;
          }
#Mean period of wind waves
's' = {
          table2Version = 1 ;
          indicatorOfParameter = 103 ;
          }
#Direction of swell waves
'Degree true' = {
          table2Version = 1 ;
          indicatorOfParameter = 104 ;
          }
#Significant height of swell waves
'm' = {
          table2Version = 1 ;
          indicatorOfParameter = 105 ;
          }
#Mean period of swell waves
's' = {
          table2Version = 1 ;
          indicatorOfParameter = 106 ;
          }
#Mean direction of primary swell
'Degree true' = {
          table2Version = 1 ;
          indicatorOfParameter = 107 ;
          }
#Mean period of primary swell
's' = {
          table2Version = 1 ;
          indicatorOfParameter = 108 ;
          }
#Secondary wave direction
'Degree true' = {
          table2Version = 1 ;
          indicatorOfParameter = 109 ;
          }
#Secondary wave mean period
's' = {
          table2Version = 1 ;
          indicatorOfParameter = 110 ;
          }
#Net short-wave radiation flux (surface)
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 111 ;
          }
#Net long-wave radiation flux (surface)
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 112 ;
          }
#Net short-wave radiation flux (atmosph.top)
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 113 ;
          }
#Net long-wave radiation flux (atmosph.top)
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 114 ;
          }
#Long-wave radiation flux
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 115 ;
          }
#Short-wave radiation flux
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 116 ;
          }
#Global radiation flux
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 117 ;
          }
#Brightness temperature
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 118 ;
          }
#Radiance (with respect to wave number)
'W m**-1 sr**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 119 ;
          }
#Radiance (with respect to wave length)
'W m-**3 sr**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 120 ;
          }
#Latent heat flux
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 121 ;
          }
#Sensible heat flux
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 122 ;
          }
#Boundary layer dissipation
'W m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 123 ;
          }
#Momentum flux, u-component
'N m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 124 ;
          }
#Momentum flux, v-component
'N m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 125 ;
          }
#Wind mixing energy
'J' = {
          table2Version = 1 ;
          indicatorOfParameter = 126 ;
          }
#Image data
'' = {
          table2Version = 1 ;
          indicatorOfParameter = 127 ;
          }
#Momentum flux
'Pa' = {
          table2Version = 1 ;
          indicatorOfParameter = 128 ;
          }
#Max wind speed (at 10m)
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 135 ;
          }
#Temperature over land
'K' = {
          table2Version = 1 ;
          indicatorOfParameter = 140 ;
          }
#Specific humidity over land
'kg kg**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 141 ;
          }
#Relative humidity over land Fraction
'' = {
          table2Version = 1 ;
          indicatorOfParameter = 142 ;
          }
#Dew point over land K
'' = {
          table2Version = 1 ;
          indicatorOfParameter = 143 ;
          }
#Slope fraction
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 160 ;
          }
#Shadow fraction
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 161 ;
          }
#Shadow parameter A
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 162 ;
          }
#Shadow parameter B
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 163 ;
          }
#Surface slope
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 165 ;
          }
#Sky wiew factor
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 166 ;
          }
#Fraction of aspect
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 167 ;
          }
#Snow albedo
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 190 ;
          }
#Snow density
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 191 ;
          }
#Water on canopy level
'kg m**-2' = {
          table2Version = 1 ;
          indicatorOfParameter = 192 ;
          }
#Surface soil ice
'm**3 m**-3' = {
          table2Version = 1 ;
          indicatorOfParameter = 193 ;
          }
#Soil type code
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 195 ;
          }
#Fraction of lake
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 196 ;
          }
#Fraction of forest
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 197 ;
          }
#Fraction of open land
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 198 ;
          }
#Vegetation type (Olsson land use)
'-' = {
          table2Version = 1 ;
          indicatorOfParameter = 199 ;
          }
#Turbulent Kinetic Energy
'J kg**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 200 ;
          }
#Maximum slope of smallest scale orography
'rad' = {
          table2Version = 1 ;
          indicatorOfParameter = 208 ;
          }
#Standard deviation of smallest scale orography
'gpm' = {
          table2Version = 1 ;
          indicatorOfParameter = 209 ;
          }
#Max wind gust
'm s**-1' = {
          table2Version = 1 ;
          indicatorOfParameter = 228 ;
          }
#Pressure
'Pa' = {
          table2Version = 253 ;
          indicatorOfParameter = 1 ;
          }
#Mean sea level pressure
'Pa' = {
          table2Version = 253 ;
          indicatorOfParameter = 2 ;
          }
#Pressure tendency
'Pa s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 3 ;
          }
#Potential vorticity
'K m**2 kg**-1 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 4 ;
          }
#ICAO Standard Atmosphere reference height
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 5 ;
          }
#Geopotential
'm**2 s**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 6 ;
          }
#Geopotential height
'gpm' = {
          table2Version = 253 ;
          indicatorOfParameter = 7 ;
          }
#Geometrical height
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 8 ;
          }
#Standard deviation of height
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 9 ;
          }
#Total column ozone
'Dobson' = {
          table2Version = 253 ;
          indicatorOfParameter = 10 ;
          }
#Temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 11 ;
          }
#Virtual potential temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 12 ;
          }
#Potential temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 13 ;
          }
#Pseudo-adiabatic potential temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 14 ;
          }
#Maximum temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 15 ;
          }
#Minimum temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 16 ;
          }
#Dew point temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 17 ;
          }
#Dew point depression (or deficit)
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 18 ;
          }
#Lapse rate
'K m**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 19 ;
          }
#Visibility
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 20 ;
          }
#Radar spectra (1)
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 21 ;
          }
#Radar spectra (2)
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 22 ;
          }
#Radar spectra (3)
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 23 ;
          }
#Parcel lifted index (to 500 hPa)
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 24 ;
          }
#Temperature anomaly
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 25 ;
          }
#Pressure anomaly
'Pa' = {
          table2Version = 253 ;
          indicatorOfParameter = 26 ;
          }
#Geopotential height anomaly
'gpm' = {
          table2Version = 253 ;
          indicatorOfParameter = 27 ;
          }
#Wave spectra (1)
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 28 ;
          }
#Wave spectra (2)
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 29 ;
          }
#Wave spectra (3)
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 30 ;
          }
#Wind direction
'Degree true' = {
          table2Version = 253 ;
          indicatorOfParameter = 31 ;
          }
#Wind speed
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 32 ;
          }
#u-component of wind
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 33 ;
          }
#v-component of wind
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 34 ;
          }
#Stream function
'm2 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 35 ;
          }
#Velocity potential
'm2 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 36 ;
          }
#Montgomery stream function
'm**2 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 37 ;
          }
#Sigma coordinate vertical velocity
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 38 ;
          }
#Pressure Vertical velocity
'Pa s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 39 ;
          }
#Vertical velocity
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 40 ;
          }
#Absolute vorticity
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 41 ;
          }
#Absolute divergence
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 42 ;
          }
#Relative vorticity
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 43 ;
          }
#Relative divergence
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 44 ;
          }
#Vertical u-component shear
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 45 ;
          }
#Vertical v-component shear
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 46 ;
          }
#Direction of current
'Degree true' = {
          table2Version = 253 ;
          indicatorOfParameter = 47 ;
          }
#Speed of current
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 48 ;
          }
#U-component of current
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 49 ;
          }
#V-component of current
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 50 ;
          }
#Specific humidity
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 51 ;
          }
#Relative humidity
'%' = {
          table2Version = 253 ;
          indicatorOfParameter = 52 ;
          }
#Humidity mixing ratio
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 53 ;
          }
#Precipitable water
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 54 ;
          }
#Vapour pressure
'Pa' = {
          table2Version = 253 ;
          indicatorOfParameter = 55 ;
          }
#Saturation deficit
'Pa' = {
          table2Version = 253 ;
          indicatorOfParameter = 56 ;
          }
#Evaporation
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 57 ;
          }
#Cloud ice
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 58 ;
          }
#Precipitation rate
'kg m**-2 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 59 ;
          }
#Thunderstorm probability
'%' = {
          table2Version = 253 ;
          indicatorOfParameter = 60 ;
          }
#Total precipitation
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 61 ;
          }
#Large scale precipitation
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 62 ;
          }
#Convective precipitation (water)
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 63 ;
          }
#Snow fall rate water equivalent
'kg m**-2 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 64 ;
          }
#Water equivalent of accumulated snow depth
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 65 ;
          }
#Snow depth
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 66 ;
          }
#Mixed layer depth
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 67 ;
          }
#Transient thermocline depth
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 68 ;
          }
#Main thermocline depth
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 69 ;
          }
#Main thermocline anomaly
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 70 ;
          }
#Total cloud cover
'(0 - 1)' = {
          table2Version = 253 ;
          indicatorOfParameter = 71 ;
          }
#Convective cloud cover
'(0 - 1)' = {
          table2Version = 253 ;
          indicatorOfParameter = 72 ;
          }
#Low cloud cover
'(0 - 1)' = {
          table2Version = 253 ;
          indicatorOfParameter = 73 ;
          }
#Medium cloud cover
'(0 - 1)' = {
          table2Version = 253 ;
          indicatorOfParameter = 74 ;
          }
#High cloud cover
'(0 - 1)' = {
          table2Version = 253 ;
          indicatorOfParameter = 75 ;
          }
#Cloud water
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 76 ;
          }
#Best lifted index (to 500 hPa)
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 77 ;
          }
#Convective snowfall
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 78 ;
          }
#Large scale snowfall
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 79 ;
          }
#Water temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 80 ;
          }
#Land cover (1=land, 0=sea)
'(0 - 1)' = {
          table2Version = 253 ;
          indicatorOfParameter = 81 ;
          }
#Deviation of sea-level from mean
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 82 ;
          }
#Surface roughness
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 83 ;
          }
#Albedo
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 84 ;
          }
#Soil temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 85 ;
          }
#Soil moisture content
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 86 ;
          }
#Vegetation
'%' = {
          table2Version = 253 ;
          indicatorOfParameter = 87 ;
          }
#Salinity
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 88 ;
          }
#Density
'kg m**-3' = {
          table2Version = 253 ;
          indicatorOfParameter = 89 ;
          }
#Water run-off
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 90 ;
          }
#Ice cover (1=land, 0=sea)
'(0 - 1)' = {
          table2Version = 253 ;
          indicatorOfParameter = 91 ;
          }
#Ice thickness
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 92 ;
          }
#Direction of ice drift
'Degree true' = {
          table2Version = 253 ;
          indicatorOfParameter = 93 ;
          }
#Speed of ice drift
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 94 ;
          }
#U-component of ice drift
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 95 ;
          }
#V-component of ice drift
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 96 ;
          }
#Ice growth rate
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 97 ;
          }
#Ice divergence
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 98 ;
          }
#Snow melt
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 99 ;
          }
#Signific.height,combined wind waves+swell
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 100 ;
          }
#Mean direction of wind waves
'Degree true' = {
          table2Version = 253 ;
          indicatorOfParameter = 101 ;
          }
#Significant height of wind waves
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 102 ;
          }
#Mean period of wind waves
's' = {
          table2Version = 253 ;
          indicatorOfParameter = 103 ;
          }
#Direction of swell waves
'Degree true' = {
          table2Version = 253 ;
          indicatorOfParameter = 104 ;
          }
#Significant height of swell waves
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 105 ;
          }
#Mean period of swell waves
's' = {
          table2Version = 253 ;
          indicatorOfParameter = 106 ;
          }
#Mean direction of primary swell
'Degree true' = {
          table2Version = 253 ;
          indicatorOfParameter = 107 ;
          }
#Mean period of primary swell
's' = {
          table2Version = 253 ;
          indicatorOfParameter = 108 ;
          }
#Secondary wave direction
'Degree true' = {
          table2Version = 253 ;
          indicatorOfParameter = 109 ;
          }
#Secondary wave mean period
's' = {
          table2Version = 253 ;
          indicatorOfParameter = 110 ;
          }
#Net short-wave radiation flux (surface)
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 111 ;
          }
#Net long-wave radiation flux (surface)
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 112 ;
          }
#Net short-wave radiation flux (atmosph.top)
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 113 ;
          }
#Net long-wave radiation flux (atmosph.top)
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 114 ;
          }
#Long-wave radiation flux
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 115 ;
          }
#Short-wave radiation flux
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 116 ;
          }
#Global radiation flux
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 117 ;
          }
#Brightness temperature
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 118 ;
          }
#Radiance (with respect to wave number)
'W m**-1 sr**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 119 ;
          }
#Radiance (with respect to wave length)
'W m-**3 sr**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 120 ;
          }
#Latent heat flux
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 121 ;
          }
#Sensible heat flux
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 122 ;
          }
#Boundary layer dissipation
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 123 ;
          }
#Momentum flux, u-component
'N m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 124 ;
          }
#Momentum flux, v-component
'N m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 125 ;
          }
#Wind mixing energy
'J' = {
          table2Version = 253 ;
          indicatorOfParameter = 126 ;
          }
#Image data
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 127 ;
          }
#Analysed RMS of PHI (CANARI)
'm**2 s**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 128 ;
          }
#Forecast RMS of PHI (CANARI)
'm**2 s**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 129 ;
          }
#SW net clear sky rad
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 130 ;
          }
#LW net clear sky rad
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 131 ;
          }
#Latent heat flux through evaporation
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 132 ;
          }
#Mask of significant cloud amount
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 133 ;
          }
#Icing index
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 135 ;
          }
#Pseudo satellite image: cloud top temperature (infrared)
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 136 ;
          }
#Pseudo satellite image: water vapour Tb
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 137 ;
          }
#Pseudo satellite image: water vapour Tb + correction for clouds
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 138 ;
          }
#Pseudo satellite image: cloud water reflectivity (visible)
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 139 ;
          }
#Direct normal irradiance
'W m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 140 ;
          }
#Precipitation Type
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 144 ;
          }
#Surface downward moon radiation
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 158 ;
          }
#CAPE out of the model
'J kg-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 160 ;
          }
#AROME hail diagnostic
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 161 ;
          }
#Gust, u-component
'm s*-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 162 ;
          }
#Gust, v-component
'm s*-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 163 ;
          }
#MOCON out of the model
' kg kg**-1 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 166 ;
          }
#Total water vapour
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 167 ;
          }
#Brightness temperature OZ clear
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 170 ;
          }
#Brightness temperature OZ cloud
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 171 ;
          }
#Brightness temperature IR clear
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 172 ;
          }
#Brightness temperature IR cloud
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 173 ;
          }
#Brightness temperature WV clear
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 174 ;
          }
#Brightness temperature WV cloud
'K' = {
          table2Version = 253 ;
          indicatorOfParameter = 175 ;
          }
#Rain
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 181 ;
          }
#Stratiform rain
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 182 ;
          }
#Convective rain
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 183 ;
          }
#Snow
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 184 ;
          }
#Total solid precipitation
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 185 ;
          }
#Cloud base
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 186 ;
          }
#Cloud top
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 187 ;
          }
#Fraction of urban land
'%' = {
          table2Version = 253 ;
          indicatorOfParameter = 188 ;
          }
#Snow albedo
'(0-1)' = {
          table2Version = 253 ;
          indicatorOfParameter = 190 ;
          }
#Snow density
'kg m**-3' = {
          table2Version = 253 ;
          indicatorOfParameter = 191 ;
          }
#Water on canopy (Interception content)
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 192 ;
          }
#Soil ice
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 193 ;
          }
#Gravity wave stress U-comp
'kg m**-1 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 195 ;
          }
#Gravity wave stress V-comp
'kg m**-1 s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 196 ;
          }
#TKE
'm**2 s**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 200 ;
          }
#Graupel
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 201 ;
          }
#Hail
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 204 ;
          }
#Simulated reflectivity
'dBz' = {
          table2Version = 253 ;
          indicatorOfParameter = 210 ;
          }
#Lightning
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 211 ;
          }
#Pressure departure
'Pa' = {
          table2Version = 253 ;
          indicatorOfParameter = 212 ;
          }
#Vertical Divergence
's**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 213 ;
          }
#Updraft omega
'ms*-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 214 ;
          }
#Downdraft omega
'ms*-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 215 ;
          }
#Updraft mesh fraction
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 216 ;
          }
#Downdraft mesh fraction
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 217 ;
          }
#Surface albedo for non snow covered areas
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 219 ;
          }
#Standard deviation of orography * g
'm**2s**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 220 ;
          }
#Anisotropy coeff of topography
'rad' = {
          table2Version = 253 ;
          indicatorOfParameter = 221 ;
          }
#Direction of main axis of topography
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 222 ;
          }
#Roughness length of bare surface * g
'm2 2**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 223 ;
          }
#Roughness length for vegetation * g
'm2 2**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 224 ;
          }
#Fraction of clay within soil
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 225 ;
          }
#Fraction of sand within soil
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 226 ;
          }
#Maximum - of vegetation
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 227 ;
          }
#Gust
'm s**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 228 ;
          }
#Albedo of bare ground
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 229 ;
          }
#Albedo of vegetation
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 230 ;
          }
#Stomatal minimum resistance
's m**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 231 ;
          }
#Leaf area index
'm**2 m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 232 ;
          }
#Dominant vegetation index
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 234 ;
          }
#Surface emissivity
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 235 ;
          }
#Maximum soil depth
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 236 ;
          }
#Soil depth
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 237 ;
          }
#Soil wetness
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 238 ;
          }
#Thermal roughness length * g
'm' = {
          table2Version = 253 ;
          indicatorOfParameter = 239 ;
          }
#Resistance to evapotransiration
's m**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 240 ;
          }
#Minimum relative moisture at 2 meters
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 241 ;
          }
#Maximum relative moisture at 2 meters
'-' = {
          table2Version = 253 ;
          indicatorOfParameter = 242 ;
          }
#Duration of total precipitation
's' = {
          table2Version = 253 ;
          indicatorOfParameter = 243 ;
          }
#Latent Heat Sublimation
'J kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 244 ;
          }
#Water evaporation
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 245 ;
          }
#Snow Sublimation
'kg m**-2' = {
          table2Version = 253 ;
          indicatorOfParameter = 246 ;
          }
#Snow history
'???' = {
          table2Version = 253 ;
          indicatorOfParameter = 247 ;
          }
#A Ozone
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 248 ;
          }
#B Ozone
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 249 ;
          }
#C Ozone
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 250 ;
          }
#Surface aerosol sea
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 251 ;
          }
#Surface aerosol land
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 252 ;
          }
#Surface aerosol soot (carbon)
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 253 ;
          }
#Surface aerosol desert
'kg kg**-1' = {
          table2Version = 253 ;
          indicatorOfParameter = 254 ;
          }
#Missing
'' = {
          table2Version = 253 ;
          indicatorOfParameter = 255 ;
          }
