#Provided by Henrik Feddersen (Danish Meteorological Institute)
#Total precipitation
'tp' = {
     table2Version = 1 ;
     indicatorOfParameter = 61 ;
    }
#10 metre wind gust
'gust' = {
     table2Version = 1 ;
     indicatorOfParameter = 228 ;
    }
#convective available potential energy
'cape' = {
     table2Version = 1 ;
     indicatorOfParameter = 225 ;
    }
#Convective inhibition
'cin' = {
     table2Version = 1 ;
     indicatorOfParameter = 224 ;
    }
