#Provided by Florian Weidle (ZAMG/Austria)
#Mean sea level pressure
'Mean sea level pressure' = {
	 table2Version = 201 ;
	 indicatorOfParameter = 151 ;
	}
#Convective available potential energy
'Convective available potential energy' = {
     table2Version = 201 ;
     indicatorOfParameter = 238 ;
    }
#Convective inhibition
'Convective inhibition' = {
     table2Version = 201 ;
     indicatorOfParameter = 243 ;
    }
#Total Precipitation
'Total precipitation' = {
     table2Version = 201 ;
     indicatorOfParameter = 208 ;
    }
#2 metre dewpoint temperature
'2 metre dewpoint temperature' = {
     table2Version = 201 ;
     indicatorOfParameter = 168 ;
    }
#2 metre temperature
'2 metre temperature' = {
     table2Version = 201 ;
     indicatorOfParameter = 167 ;
    }
#10 metre U wind component
'10 metre U wind component' = {
     table2Version = 201 ;
     indicatorOfParameter = 165 ;
    }
#10 metre V wind component
'10 metre V wind component' = {
     table2Version = 201 ;
     indicatorOfParameter = 166 ;
    }
#10 metre wind gust
'10 metre wind gust' = {
     table2Version = 201 ;
     indicatorOfParameter = 206 ;
    }
#Large-scale precipitation
'Large-scale precipitation' = {
     table2Version = 201 ;
     indicatorOfParameter = 232 ;
    }
#Land-sea mask
'Land-sea mask' = {
     table2Version = 201 ;
     indicatorOfParameter = 81 ;
    }
#Geopotential
'Geopotential' = {
     table2Version = 201 ;
     indicatorOfParameter = 235 ;
    }
#Geopotential Height
'Geopotential Height' = {
     table2Version = 201 ;
     indicatorOfParameter = 233 ;
    }
