Maxima 04615CMGY Gold Analog Watch  - For Men - Buy Maxima 04615CMGY Gold Analog Watch  - For Men  04615CMGY Online at Rs.795 in India Only at Flipkart.com. Round Dial, Golden Strap, Brass Case, Water Resistant - Great Discounts, Only Genuine Products, 30 Day Replacement Guarantee, Free Shipping. Cash On Delivery!