Dhrohar Rose Gold Tone Statement Rose Gold Plated Alloy Necklace - Buy Dhrohar Rose Gold Tone Statement Rose Gold Plated Alloy Necklace only for Rs. 399 from Flipkart.com. Only Genuine Products. 30 Day Replacement Guarantee. Free Shipping. Cash On Delivery!