Ratnam Gold Ruby, Diamond 14 K Ring - Buy Ratnam Gold Ruby, Diamond 14 K Ring only for Rs. 35850 from Flipkart.com. Only Genuine Products. 30 Day Replacement Guarantee. Free Shipping. Cash On Delivery!