Key Features of Hako 60W Magsafe Laptop Charger For APPLE MacBook 13 MB466CHA 60 Adapter Designed For: APPLE MacBook 13" MB466LL/A MAGSAFE,Hako 60W Magsafe Laptop Charger For APPLE MacBook 13 MB466CHA 60 Adapter Price: Rs. 1,799 Hako laptop adapters come with high quality certification and are compatible with respective brands, all adapters are equipped with protection circuit to protect the laptop all adapters come with 1year warranty.,Specifications of Hako 60W Magsafe Laptop Charger For APPLE MacBook 13 MB466CHA 60 Adapter General Brand Hako Designed For APPLE MacBook 13" MB466LL/A MAGSAFE Sales Package 1 Laptop Adapter Model Name APPLE MacBook 13" MB466LL/A MAGSAFE Model Id 60W Magsafe Laptop Charger For APPLE MacBook 13 MB466CHA Power Power Consumption (W) 60 W Warranty Covered in Warranty Manufacturing Defects Only Warranty Summary 1 Year Warranty Warranty Service Type To Claim a Warranty Customer needs to contact seller.. Then he will be guided to the nearest service center.. If the service center is not available in in his area then he needs to courier the product to seller and we will replace the product and send via courier Not Covered in Warranty Any Physcal Damage will not be covered under warranty