Key Features of LAIBA  Battery - Laiba Battery - BOPA2100 Lithium Ion Mobile Battery for HTC DESIRE 516 Capacity: 1950 mAh Type: Lithium-ion,Specifications of LAIBA  Battery - Laiba Battery - BOPA2100 Lithium Ion Mobile Battery for HTC DESIRE 516 (Black) Warranty Covered in Warranty Covers specific details on what would actually the warranty cover Warranty Summary 3 Month Seller Warranty Warranty Service Type Customer Needs To Contact Seller Not Covered in Warranty This elaborates on the things that, if damaged, will not be repaired/covered under warranty General Features Brand LAIBA Battery Capacity 1950 mAh Model ID Laiba Battery - BOPA2100 Lithium Ion Mobile Battery for HTC DESIRE 516 Color Black In Sales Package Battery