Rakam Gold Diamond Yellow Gold 18 K Ring - Buy Rakam Gold Diamond Yellow Gold 18 K Ring only for Rs. 29643 from Flipkart.com. Only Genuine Products. 30 Day Replacement Guarantee. Free Shipping. Cash On Delivery!