Gia White Gold Plated Alloy, Metal Necklace - Buy Gia White Gold Plated Alloy, Metal Necklace only for Rs. 329 from Flipkart.com. Only Genuine Products. 30 Day Replacement Guarantee. Free Shipping. Cash On Delivery!