The Fine World Contemporary Designer Floral Brass Zircon Metal Drop Earring - Buy The Fine World Contemporary Designer Floral Brass Zircon Metal Drop Earring only for Rs. 805 from Flipkart.com. Only Genuine Products. 30 Day Replacement Guarantee. Free Shipping. Cash On Delivery!