Scheffer's SC-B-S-2862 Simple Analog Watch  - For Men - Buy Scheffer's SC-B-S-2862 Simple Analog Watch  - For Men  SC-B-S-2862 Online at Rs.399 in India Only at Flipkart.com. - Great Discounts, Only Genuine Products, 30 Day Replacement Guarantee, Free Shipping. Cash On Delivery!