HMT G5141 Watch  - For Men - Buy HMT G5141 Watch  - For Men  G5141 Online at Rs.899 in India Only at Flipkart.com. - Great Discounts, Only Genuine Products, 30 Day Replacement Guarantee, Free Shipping. Cash On Delivery!