Key Features of Magic 22K Yellow Gold Plated Brass Chain Material: Brass Colour: Gold and Silver Design: Chain Keep it away from Water & Perfume,Magic 22K Yellow Gold Plated Brass Chain Price: Rs. 1,212 18Ct Gold And Rhodium Plated Chain. Gold plated items have a layer of real gold deposited over another metal. Our jewelry items have gold plated over brass, which gives them a weight that is very similar to real gold jewelry. Provide your necklace designs with a delicate base using this 18-inch fine chain necklace. Featuring gold-plated brass, this chain displays brilliant gold luster and will complement designs with warm color schemes and gold components. Our chains are made with the finest craftsmanship available today. All of our jewelry items are brand new by Magic and quality inspected multiple times before shipment.,Specifications of Magic 22K Yellow Gold Plated Brass Chain Pearl Features Pearl Type NA General Brand Magic Collection Designer Model Number MGCJE070 Precious/Artificial Jewellery Fashion Jewellery Type Chain Ideal For Men, Women Occasion Everyday Color Gold, Silver Silver Features Silver Weight NA g Diamond Features Diamond Weight NA carat Diamond Shape NA Diamond Color Grade NA Diamond Clarity NA Gold Features Gold Purity NA K Body & Design Features Base Material Brass Gemstone NA Plating 22K Yellow Gold Clasp Type Lobster Claw In the Box Sales Package 1 Necklace Chain Pack of 1 Additional Features Certification Brand Certification