Buy Yuccabe Italia Stella Black Self Watering Plant Container Set for Rs.3399 online. Yuccabe Italia Stella Black Self Watering Plant Container Set at best prices with FREE shipping & cash on delivery. Only Genuine Products. 30 Day Replacement Guarantee.