/* This file contains the definitions and documentation for the
   Cilk Plus builtins used in the GNU compiler.
   Copyright (C) 2013-2015 Free Software Foundation, Inc.

   Contributed by Balaji V. Iyer <balaji.v.iyer@intel.com>
   	          Intel Corporation.

This file is part of GCC.

GCC is free software; you can redistribute it and/or modify it under
the terms of the GNU General Public License as published by the Free
Software Foundation; either version 3, or (at your option) any later
version.

GCC is distributed in the hope that it will be useful, but WITHOUT ANY
WARRANTY; without even the implied warranty of MERCHANTABILITY or
FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public License
for more details.

You should have received a copy of the GNU General Public License
along with GCC; see the file COPYING3.  If not see
<http://www.gnu.org/licenses/>.  */

DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_ENTER_FRAME, "__cilkrts_enter_frame_1")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_ENTER_FRAME_FAST, 
		       "__cilkrts_enter_frame_fast_1")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_DETACH, "__cilkrts_detach")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_RETHROW, "__cilkrts_rethrow")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_SYNCHED, "__cilkrts_synched")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_SYNC, "__cilkrts_sync")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_LEAVE_FRAME, "__cilkrts_leave_frame")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_POP_FRAME, "__cilkrts_pop_frame")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_SAVE_FP, "__cilkrts_save_fp_ctrl_state")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_FOR_32, "__cilkrts_cilk_for_32")
DEF_CILK_BUILTIN_STUB (BUILT_IN_CILK_FOR_64, "__cilkrts_cilk_for_64")
